172	5
1	VAR1	Variable1	0	8	2	99999	
2	VAR2	Variable2	0	8	2	99999	
3	VAR3	Variable3	0	8	2	99999	
4	VAR4	Variable4	0	8	2	99999	
5	VAR5	Variable5	0	8	2	99999	
UNITS	VAR1	VAR2	VAR3	VAR4	VAR5	
CASE1	158	126.58	0.2	17.6	4	
CASE2	31	100.73	0.2	26.6	4	
CASE3	193	168.99	0.2	31.4	4.5	
CASE4	92	98.38	0.6	35.9	5.5	
CASE5	1	165.07	0.1	36	7	
CASE6	198	125.77	0.1	37.8	6.5	
CASE7	77	80.46	0.4	40.1	6	
CASE8	190	59.98	0.6	40.2	3.5	
CASE9	103	62.49	0.2	40.4	7	
CASE10	22	89.75	0.4	40.9	2	
CASE11	139	78.15	0.5	41.7	5.5	
CASE12	6	197.12	0.5	42	6	
CASE13	24	110.99	0.2	42.2	6.5	
CASE14	93	116.28	0.4	42.4	4.5	
CASE15	65	103.67	0.1	42.7	5	
CASE16	17	71.66	0.4	43.1	3.5	
CASE17	152	75.93	0.2	45.2	3.5	
CASE18	165	83.09	0.5	45.7	5.5	
CASE19	134	118.52	0.3	46.4	2.5	
CASE20	40	101.27	0.2	47.5	5.5	
CASE21	149	136.55	0.2	47.8	3.5	
CASE22	49	99.35	0.8	50.9	5.5	
CASE23	39	95.73	0.3	51	3.5	
CASE24	33	71.16	0.1	51.6	6	
CASE25	148	49.72	1.3	51.7	4.5	
CASE26	95	82.54	0.3	52.9	5.5	
CASE27	230	62.52	1.2	53	2	
CASE28	44	86.33	0.3	56.5	5	
CASE29	60	39.67	1.2	57.7	5.5	
CASE30	192	17.74	7.7	58	3	
CASE31	63	53.37	0.2	58.6	6	
CASE32	100	64.9	0.5	59.5	2.5	
CASE33	213	70.51	0.3	60.9	5	
CASE34	202	70.21	0.4	61.1	7	
CASE35	131	105.15	0.2	62.7	3	
CASE36	76	59.18	3.6	63.2	4.5	
CASE37	168	59.89	0.9	64.6	2.5	
CASE38	46	100.94	0.1	65.5	6.5	
CASE39	119	94.8	0.5	66.4	6.5	
CASE40	183	15.64	4.1	67	1.5	
CASE41	157	34.69	0.5	67.5	3	
CASE42	55	111.34	0.7	67.9	4.5	
CASE43	159	106.92	0.9	68	4	
CASE44	130	85.26	0.2	68.9	3	
CASE45	34	81.95	0.3	69.4	6	
CASE46	223	77.38	0.3	69.9	5.5	
CASE47	3	36.84	1.7	70	5.5	
CASE48	180	98.91	0.3	70.4	6.5	
CASE49	90	37.78	1.6	70.6	3.5	
CASE50	217	30.09	2.5	74.2	5.5	
CASE51	83	63.2	0.4	74.8	2.5	
CASE52	164	23.28	6.2	75.8	5.5	
CASE53	96	30	0.7	76.2	3	
CASE54	37	54.58	1.3	76.6	1.5	
CASE55	208	34.86	2.3	76.9	7	
CASE56	225	17.17	16.9	77.9	5.5	
CASE57	211	109.22	0.2	78.2	4	
CASE58	189	15.72	6.4	78.8	7	
CASE59	35	71.6	0.7	79	6.5	
CASE60	102	48.34	1.9	79.4	6	
CASE61	27	60.25	3.5	79.8	2	
CASE62	61	29.22	1.8	80.2	2.5	
CASE63	242	95.58	0.4	80.6	4.5	
CASE64	205	74.9	1.5	81.6	5.5	
CASE65	176	22.14	18.1	82.5	6	
CASE66	124	30.08	6.2	82.6	7	
CASE67	117	11.55	12.2	83.5	4.5	
CASE68	45	98.49	0.7	83.8	5	
CASE69	150	51.03	2.2	84	2.5	
CASE70	57	35.7	2.1	84.7	2	
CASE71	122	97.31	0.6	84.8	4	
CASE72	113	71.84	0.3	85.1	5.5	
CASE73	32	72.2	3.1	85.3	7	
CASE74	140	17.73	4.4	85.6	1.5	
CASE75	62	99.31	1.5	85.7	7	
CASE76	199	63.34	3.9	86.4	1.5	
CASE77	28	35.22	4.6	86.4	3	
CASE78	2	24.64	1	86.5	4.5	
CASE79	218	48.9	3	86.5	4.5	
CASE80	25	60.44	1	87.2	2	
CASE81	121	29.3	3.6	87.4	5.5	
CASE82	101	42.14	1	87.9	3.5	
CASE83	107	18.29	2.1	87.9	2	
CASE84	132	20.96	4.9	88.7	5	
CASE85	8	23.05	8.7	89	3	
CASE86	16	20.48	10.4	89.1	6.5	
CASE87	232	30.29	0.4	90.3	6.5	
CASE88	243	56.24	0.6	90.7	5.5	
CASE89	42	30.26	0.8	90.9	6.5	
CASE90	170	37.3	2.3	90.9	3	
CASE91	111	21.11	1.5	91.3	4	
CASE92	142	25.09	3.8	92.2	2.5	
CASE93	201	16.51	0.9	92.3	3.5	
CASE94	59	28.1	1.5	92.5	3	
CASE95	43	24.7	2.3	92.5	4	
CASE96	194	3.03	28.4	92.5	5	
CASE97	171	27.35	1.2	92.6	2.5	
CASE98	212	23.74	2.8	92.6	2.5	
CASE99	167	18.76	3.8	92.6	1.5	
CASE100	135	5.91	10.4	92.8	1	
CASE101	191	16.19	1.2	93	4	
CASE102	203	26.6	1.4	93	1.5	
CASE103	174	5.62	13	93.3	1	
CASE104	231	26.17	3.3	93.4	4	
CASE105	68	14.45	2.7	93.7	4.5	
CASE106	29	14.84	16	93.9	6	
CASE107	169	30.81	1.7	94	3.5	
CASE108	56	17.13	3	94	1	
CASE109	21	28.83	3.2	94.1	1	
CASE110	105	7.9	18.1	95.4	2	
CASE111	15	27.79	12.6	95.6	1	
CASE112	185	17.06	2.7	96	1.5	
CASE113	48	11.49	3.8	96	1.5	
CASE114	209	7.03	15.3	96.1	1.5	
CASE115	41	10.1	5.7	96.2	2	
CASE116	14	83.41	0.4	97	5.5	
CASE117	118	41.91	0.4	97	5.5	
CASE118	51	6.94	1.7	97	7	
CASE119	182	16.72	7.1	97	1.5	
CASE120	36	5.08	23.1	97	1	
CASE121	227	6.99	31.9	97	1	
CASE122	9	17.75	7.9	97.1	1.5	
CASE123	133	65.52	1.9	97.2	5.5	
CASE124	18	13.13	8.1	97.4	1	
CASE125	85	6.08	12.8	97.5	2	
CASE126	52	8.07	13.6	97.6	1	
CASE127	146	62.59	0.4	97.8	2.5	
CASE128	116	7.05	13.2	97.9	2	
CASE129	200	4.6	17.3	97.9	1.5	
CASE130	219	73.3	1.3	98	7	
CASE131	87	14.63	4.6	98	1.5	
CASE132	228	13.9	6.4	98	1	
CASE133	104	5.95	27.8	98	1	
CASE134	20	5.07	30.9	98	1.5	
CASE135	13	4.82	33.3	98	1	
CASE136	112	35.42	1.2	98.4	5.5	
CASE137	178	30.72	1.5	98.4	2	
CASE138	50	7.28	4.9	98.5	2.5	
CASE139	10	27.69	0.5	98.6	4	
CASE140	30	24.61	1.5	98.6	2.5	
CASE141	216	29.12	5.2	98.6	2	
CASE142	106	6.43	21	98.6	1.5	
CASE143	94	38.47	0.9	98.8	2	
CASE144	115	34.36	0.4	99	7	
CASE145	79	20.31	0.8	99	4	
CASE146	156	6.39	18	99	1	
CASE147	226	5.46	22.3	99	1.5	
CASE148	73	4.55	29.9	99	1.5	
CASE149	153	5.44	31.3	99	1	
CASE150	80	4.34	32.7	99	1.5	
CASE151	206	2.99	32.9	99	1	
CASE152	108	3.36	44.6	99	1.5	
CASE153	207	4.53	46.9	99	1	
CASE154	144	43.32	0.3	99.1	3	
CASE155	229	72.13	0.5	99.3	6.5	
CASE156	210	117.42	0.1	99.4	6	
CASE157	98	9.35	5.4	99.4	1.5	
CASE158	19	14.63	1.4	99.6	6	
CASE159	126	8.34	2	99.6	1.5	
CASE160	179	19.06	2.4	99.6	5	
CASE161	224	12.37	0.7	99.7	4	
CASE162	196	4.72	11.6	99.7	1.5	
CASE163	120	10.6	2.4	99.8	1.5	
CASE164	64	8.72	3.3	99.8	1.5	
CASE165	173	8.16	4.2	99.8	1.5	
CASE166	53	4.14	5.4	99.9	1.5	
CASE167	99	4.49	31.2	99.9	1	
CASE168	12	5.04	23	100	1	
CASE169	69	3.74	31.7	100	1	
CASE170	54	5.36	38.7	100	1	
CASE171	163	3.79	39.5	100	1	
CASE172	127	5.17	58.2	100	1	
